23 104
100.0 635000.0
80.0 508000.0
100.0 635000.0
100.0 635000.0
60.0 381000.0
120.0 762000.0
40.0 254000.0
60.0 381000.0
120.0 762000.0
40.0 254000.0
100.0 635000.0
200.0 1270000.0
150.0 952500.0
60.0 381000.0
150.0 952500.0
30.0 190500.0
100.0 635000.0
100.0 635000.0
30.0 190500.0
200.0 1270000.0
150.0 952500.0
150.0 952500.0
60.0 381000.0
6.0 11.9 12.7 0.9 8.7 2.4 7.9 1.1 1.0 34.8 13.9 1.7 1.9 6.6 17.3 1.4 14.7 2.9 11.4 0.9 12.1 2.2 2.6 8.1 6.2 2.8 5.6 22.6 6.4 1.7 2.5 3.9 31.6 12.1 6.8 15.5 0.4 0.8 2.6 0.9 1.5 0.8 6.6 7.6 1.0 11.8 10.3 2.6 6.5 119.6 3.5 10.6 1.9 1.5 25.6 17.1 2.2 1.2 20.8 2.5 18.2 2.5 16.8 10.5 3.5 0.5 2.8 2.3 6.1 3.8 3.2 1.8 6.9 14.2 4.7 1.1 70.1 0.5 2.1 15.1 2.8 0.3 1.7 2.5 2.1 7.0 2.2 7.8 2.5 9.6 23.0 9.2 2.1 2.7 4.7 4.5 13.8 0.0 3.1 13.3 8.6 11.9 2.7 0.5 
50000.0 15415.0 4042.0 50000.0 7862.0 9885.0 9885.0 15415.0 15415.0 15415.0 15415.0 50000.0 15415.0 15415.0 9885.0 50000.0 15415.0 15415.0 50000.0 15415.0 15415.0 9885.0 50000.0 50000.0 15415.0 15415.0 50000.0 50000.0 50000.0 50000.0 9885.0 15415.0 15415.0 9885.0 15415.0 50000.0 15415.0 15415.0 50000.0 15415.0 50000.0 15415.0 50000.0 15415.0 15415.0 15415.0 15415.0 6194.0 50000.0 15415.0 15415.0 15415.0 15415.0 50000.0 15415.0 15415.0 50000.0 50000.0 50000.0 15415.0 15415.0 9885.0 9885.0 15415.0 15415.0 15415.0 15415.0 6194.0 15415.0 15415.0 15415.0 9885.0 50000.0 15415.0 50000.0 9885.0 6194.0 6194.0 15415.0 15415.0 15415.0 6194.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 7862.0 15415.0 50000.0 50000.0 9885.0 15415.0 15415.0 15415.0 15415.0 50000.0 15415.0 15415.0 15415.0 15415.0 15415.0 50000.0 
50000.0 4042.0 15415.0 9885.0 50000.0 50000.0 15415.0 4042.0 50000.0 50000.0 9885.0 7862.0 15415.0 50000.0 15415.0 50000.0 9885.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 6194.0 9885.0 9885.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 50000.0 7862.0 15415.0 15415.0 9885.0 50000.0 50000.0 9885.0 50000.0 15415.0 7862.0 50000.0 15415.0 50000.0 50000.0 7862.0 50000.0 9885.0 9885.0 50000.0 50000.0 6194.0 50000.0 50000.0 50000.0 7862.0 15415.0 50000.0 15415.0 15415.0 15415.0 15415.0 9885.0 15415.0 15415.0 6194.0 50000.0 15415.0 50000.0 9885.0 50000.0 50000.0 50000.0 15415.0 15415.0 50000.0 15415.0 15415.0 15415.0 9885.0 50000.0 50000.0 7862.0 50000.0 50000.0 15415.0 6194.0 50000.0 50000.0 50000.0 15415.0 15415.0 9885.0 9885.0 6194.0 15415.0 15415.0 15415.0 50000.0 50000.0 
50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 50000.0 50000.0 9885.0 4042.0 50000.0 50000.0 50000.0 9885.0 50000.0 7862.0 50000.0 50000.0 50000.0 9885.0 15415.0 15415.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 50000.0 50000.0 7862.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 50000.0 7862.0 50000.0 50000.0 15415.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 6194.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 15415.0 50000.0 50000.0 15415.0 15415.0 15415.0 50000.0 9885.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 6194.0 15415.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 15415.0 
50000.0 9885.0 9885.0 15415.0 15415.0 15415.0 9885.0 15415.0 50000.0 50000.0 9885.0 9885.0 9885.0 50000.0 4042.0 50000.0 9885.0 15415.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 9885.0 50000.0 50000.0 50000.0 50000.0 4042.0 50000.0 7862.0 6194.0 15415.0 15415.0 15415.0 9885.0 15415.0 50000.0 50000.0 15415.0 50000.0 9885.0 9885.0 15415.0 9885.0 15415.0 50000.0 9885.0 7862.0 4042.0 9885.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 7862.0 7862.0 15415.0 15415.0 9885.0 9885.0 6194.0 6194.0 7862.0 7862.0 9885.0 50000.0 6194.0 50000.0 6194.0 50000.0 15415.0 15415.0 7862.0 6194.0 50000.0 9885.0 7862.0 15415.0 9885.0 50000.0 50000.0 15415.0 50000.0 15415.0 9885.0 15415.0 50000.0 15415.0 15415.0 9885.0 15415.0 15415.0 15415.0 15415.0 9885.0 9885.0 7862.0 15415.0 50000.0 
50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 4042.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 6194.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 
6194.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 4042.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 4042.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 
50000.0 50000.0 15415.0 50000.0 15415.0 9885.0 15415.0 50000.0 6194.0 15415.0 50000.0 15415.0 50000.0 4042.0 50000.0 15415.0 50000.0 50000.0 50000.0 7862.0 4042.0 9885.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 50000.0 50000.0 7862.0 15415.0 50000.0 7862.0 50000.0 50000.0 15415.0 50000.0 6194.0 15415.0 50000.0 15415.0 50000.0 50000.0 9885.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 4042.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 15415.0 50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 50000.0 9885.0 50000.0 50000.0 50000.0 50000.0 15415.0 9885.0 15415.0 50000.0 6194.0 15415.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 
9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 50000.0 50000.0 50000.0 4042.0 50000.0 6194.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 6194.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 6194.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 
50000.0 15415.0 15415.0 15415.0 15415.0 15415.0 6194.0 15415.0 50000.0 50000.0 15415.0 15415.0 15415.0 15415.0 50000.0 50000.0 15415.0 15415.0 50000.0 15415.0 15415.0 15415.0 50000.0 15415.0 15415.0 9885.0 50000.0 50000.0 50000.0 50000.0 9885.0 50000.0 4042.0 9885.0 15415.0 9885.0 15415.0 7862.0 15415.0 15415.0 50000.0 15415.0 50000.0 7862.0 15415.0 15415.0 6194.0 15415.0 50000.0 15415.0 9885.0 7862.0 7862.0 50000.0 15415.0 15415.0 50000.0 50000.0 50000.0 9885.0 9885.0 15415.0 9885.0 6194.0 15415.0 4042.0 9885.0 15415.0 4042.0 15415.0 50000.0 9885.0 50000.0 9885.0 50000.0 15415.0 15415.0 9885.0 9885.0 50000.0 6194.0 9885.0 15415.0 7862.0 50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 15415.0 50000.0 9885.0 15415.0 15415.0 15415.0 15415.0 15415.0 15415.0 15415.0 15415.0 9885.0 9885.0 50000.0 
50000.0 6194.0 50000.0 9885.0 50000.0 50000.0 15415.0 7862.0 50000.0 50000.0 9885.0 9885.0 15415.0 50000.0 15415.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 9885.0 9885.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 9885.0 15415.0 50000.0 4042.0 50000.0 15415.0 7862.0 50000.0 50000.0 9885.0 50000.0 9885.0 9885.0 50000.0 9885.0 50000.0 50000.0 7862.0 9885.0 15415.0 7862.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 7862.0 15415.0 50000.0 15415.0 9885.0 15415.0 9885.0 9885.0 15415.0 9885.0 7862.0 50000.0 15415.0 50000.0 9885.0 50000.0 15415.0 50000.0 15415.0 15415.0 50000.0 15415.0 15415.0 15415.0 7862.0 50000.0 50000.0 4042.0 50000.0 50000.0 15415.0 9885.0 50000.0 15415.0 50000.0 15415.0 50000.0 9885.0 9885.0 7862.0 15415.0 15415.0 15415.0 15415.0 50000.0 
50000.0 6194.0 15415.0 9885.0 50000.0 50000.0 15415.0 7862.0 50000.0 50000.0 4042.0 6194.0 15415.0 50000.0 9885.0 50000.0 6194.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 4042.0 6194.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 50000.0 7862.0 15415.0 15415.0 9885.0 50000.0 50000.0 6194.0 50000.0 15415.0 4042.0 50000.0 15415.0 15415.0 50000.0 4042.0 7862.0 9885.0 9885.0 50000.0 50000.0 4042.0 50000.0 50000.0 50000.0 6194.0 9885.0 50000.0 15415.0 15415.0 15415.0 15415.0 7862.0 15415.0 15415.0 4042.0 50000.0 15415.0 50000.0 7862.0 50000.0 50000.0 50000.0 15415.0 15415.0 50000.0 15415.0 15415.0 7862.0 9885.0 50000.0 50000.0 9885.0 50000.0 50000.0 9885.0 7862.0 50000.0 50000.0 15415.0 15415.0 15415.0 6194.0 7862.0 6194.0 15415.0 9885.0 9885.0 50000.0 50000.0 
50000.0 50000.0 15415.0 50000.0 15415.0 9885.0 15415.0 50000.0 6194.0 15415.0 50000.0 50000.0 50000.0 6194.0 50000.0 15415.0 50000.0 50000.0 50000.0 7862.0 4042.0 9885.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 50000.0 50000.0 9885.0 15415.0 50000.0 7862.0 50000.0 50000.0 15415.0 50000.0 7862.0 15415.0 50000.0 15415.0 50000.0 50000.0 9885.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 4042.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 15415.0 50000.0 50000.0 15415.0 50000.0 15415.0 50000.0 50000.0 9885.0 50000.0 15415.0 50000.0 50000.0 15415.0 9885.0 50000.0 50000.0 6194.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 
50000.0 15415.0 15415.0 15415.0 15415.0 15415.0 15415.0 15415.0 50000.0 50000.0 9885.0 15415.0 7862.0 50000.0 7862.0 50000.0 7862.0 9885.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 9885.0 50000.0 50000.0 50000.0 50000.0 6194.0 50000.0 9885.0 9885.0 50000.0 15415.0 9885.0 15415.0 15415.0 50000.0 50000.0 9885.0 50000.0 15415.0 9885.0 50000.0 15415.0 15415.0 50000.0 9885.0 7862.0 7862.0 15415.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 9885.0 4042.0 15415.0 15415.0 15415.0 7862.0 9885.0 9885.0 9885.0 9885.0 15415.0 50000.0 7862.0 50000.0 9885.0 50000.0 15415.0 15415.0 9885.0 4042.0 50000.0 15415.0 9885.0 15415.0 15415.0 50000.0 50000.0 15415.0 50000.0 15415.0 9885.0 15415.0 50000.0 15415.0 9885.0 6194.0 7862.0 15415.0 15415.0 15415.0 4042.0 4042.0 6194.0 15415.0 50000.0 
7862.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 4042.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 
50000.0 9885.0 15415.0 15415.0 15415.0 15415.0 15415.0 9885.0 50000.0 50000.0 7862.0 9885.0 15415.0 50000.0 6194.0 50000.0 7862.0 9885.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 9885.0 6194.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 9885.0 9885.0 50000.0 9885.0 15415.0 15415.0 15415.0 50000.0 50000.0 9885.0 50000.0 9885.0 6194.0 50000.0 9885.0 15415.0 50000.0 7862.0 6194.0 6194.0 7862.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 6194.0 9885.0 15415.0 15415.0 9885.0 15415.0 9885.0 4042.0 9885.0 9885.0 7862.0 50000.0 9885.0 50000.0 4042.0 50000.0 15415.0 15415.0 9885.0 9885.0 50000.0 9885.0 9885.0 15415.0 7862.0 50000.0 50000.0 9885.0 50000.0 15415.0 9885.0 9885.0 50000.0 15415.0 15415.0 9885.0 15415.0 9885.0 9885.0 9885.0 9885.0 7862.0 7862.0 15415.0 50000.0 
50000.0 15415.0 9885.0 50000.0 9885.0 9885.0 6194.0 15415.0 15415.0 50000.0 15415.0 50000.0 15415.0 15415.0 15415.0 50000.0 15415.0 50000.0 50000.0 15415.0 15415.0 15415.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 9885.0 9885.0 9885.0 15415.0 15415.0 9885.0 15415.0 15415.0 50000.0 50000.0 50000.0 9885.0 15415.0 9885.0 9885.0 7862.0 50000.0 15415.0 15415.0 15415.0 15415.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 15415.0 4042.0 9885.0 15415.0 9885.0 15415.0 9885.0 9885.0 15415.0 50000.0 9885.0 50000.0 15415.0 50000.0 7862.0 9885.0 9885.0 15415.0 15415.0 7862.0 9885.0 50000.0 15415.0 50000.0 50000.0 15415.0 50000.0 9885.0 15415.0 50000.0 50000.0 6194.0 15415.0 15415.0 15415.0 50000.0 50000.0 50000.0 15415.0 15415.0 15415.0 7862.0 50000.0 
50000.0 50000.0 9885.0 50000.0 6194.0 6194.0 15415.0 50000.0 15415.0 15415.0 50000.0 50000.0 50000.0 9885.0 15415.0 15415.0 50000.0 50000.0 50000.0 9885.0 9885.0 4042.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 9885.0 15415.0 15415.0 9885.0 50000.0 50000.0 15415.0 50000.0 9885.0 50000.0 50000.0 15415.0 50000.0 50000.0 9885.0 50000.0 7862.0 50000.0 50000.0 15415.0 15415.0 50000.0 15415.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 4042.0 15415.0 50000.0 50000.0 15415.0 15415.0 9885.0 50000.0 50000.0 15415.0 15415.0 50000.0 15415.0 50000.0 9885.0 9885.0 9885.0 15415.0 15415.0 15415.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 6194.0 50000.0 50000.0 50000.0 9885.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 15415.0 15415.0 50000.0 
50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 50000.0 50000.0 7862.0 7862.0 50000.0 50000.0 50000.0 7862.0 50000.0 9885.0 50000.0 50000.0 50000.0 9885.0 9885.0 15415.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 50000.0 50000.0 7862.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 9885.0 15415.0 50000.0 9885.0 50000.0 50000.0 15415.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 4042.0 50000.0 15415.0 50000.0 50000.0 15415.0 15415.0 50000.0 50000.0 7862.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 15415.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 
50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 50000.0 50000.0 7862.0 7862.0 50000.0 50000.0 50000.0 7862.0 50000.0 9885.0 50000.0 50000.0 50000.0 9885.0 9885.0 15415.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 50000.0 50000.0 7862.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 9885.0 15415.0 50000.0 9885.0 50000.0 50000.0 15415.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 4042.0 50000.0 15415.0 50000.0 50000.0 15415.0 15415.0 50000.0 50000.0 7862.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 9885.0 15415.0 50000.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 
50000.0 50000.0 15415.0 50000.0 9885.0 7862.0 9885.0 50000.0 9885.0 15415.0 50000.0 50000.0 50000.0 9885.0 15415.0 50000.0 50000.0 50000.0 50000.0 9885.0 9885.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 15415.0 15415.0 15415.0 6194.0 50000.0 50000.0 9885.0 50000.0 9885.0 50000.0 50000.0 50000.0 15415.0 50000.0 6194.0 15415.0 9885.0 50000.0 50000.0 15415.0 15415.0 15415.0 15415.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 9885.0 9885.0 15415.0 50000.0 15415.0 15415.0 15415.0 15415.0 50000.0 15415.0 15415.0 50000.0 15415.0 50000.0 6194.0 4042.0 15415.0 15415.0 15415.0 9885.0 15415.0 50000.0 15415.0 50000.0 50000.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 7862.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 
50000.0 15415.0 15415.0 15415.0 15415.0 15415.0 15415.0 15415.0 50000.0 50000.0 9885.0 15415.0 7862.0 50000.0 9885.0 50000.0 9885.0 9885.0 50000.0 50000.0 50000.0 15415.0 50000.0 15415.0 15415.0 9885.0 50000.0 50000.0 50000.0 50000.0 7862.0 50000.0 15415.0 9885.0 50000.0 15415.0 7862.0 15415.0 15415.0 50000.0 50000.0 15415.0 50000.0 15415.0 9885.0 50000.0 15415.0 15415.0 50000.0 15415.0 9885.0 9885.0 15415.0 50000.0 50000.0 15415.0 50000.0 50000.0 50000.0 15415.0 4042.0 15415.0 15415.0 15415.0 6194.0 9885.0 9885.0 9885.0 15415.0 15415.0 50000.0 7862.0 50000.0 9885.0 50000.0 15415.0 50000.0 9885.0 6194.0 50000.0 15415.0 9885.0 15415.0 15415.0 50000.0 50000.0 15415.0 50000.0 15415.0 9885.0 15415.0 50000.0 15415.0 9885.0 4042.0 7862.0 15415.0 15415.0 15415.0 4042.0 6194.0 7862.0 15415.0 50000.0 
50000.0 9885.0 15415.0 15415.0 15415.0 50000.0 15415.0 15415.0 50000.0 50000.0 7862.0 9885.0 9885.0 50000.0 7862.0 50000.0 6194.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 9885.0 7862.0 50000.0 50000.0 50000.0 50000.0 6194.0 50000.0 9885.0 9885.0 50000.0 15415.0 9885.0 15415.0 15415.0 50000.0 50000.0 7862.0 50000.0 15415.0 7862.0 50000.0 15415.0 15415.0 50000.0 9885.0 4042.0 6194.0 9885.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 7862.0 6194.0 15415.0 15415.0 15415.0 9885.0 9885.0 7862.0 15415.0 9885.0 9885.0 50000.0 9885.0 50000.0 7862.0 50000.0 15415.0 50000.0 15415.0 6194.0 50000.0 15415.0 15415.0 9885.0 9885.0 50000.0 50000.0 15415.0 50000.0 15415.0 6194.0 15415.0 50000.0 15415.0 15415.0 7862.0 9885.0 9885.0 15415.0 9885.0 7862.0 4042.0 4042.0 15415.0 50000.0 
50000.0 9885.0 15415.0 15415.0 15415.0 50000.0 15415.0 15415.0 50000.0 50000.0 7862.0 9885.0 9885.0 50000.0 7862.0 50000.0 6194.0 9885.0 50000.0 50000.0 50000.0 50000.0 50000.0 15415.0 9885.0 7862.0 50000.0 50000.0 50000.0 50000.0 6194.0 50000.0 9885.0 9885.0 50000.0 15415.0 9885.0 15415.0 15415.0 50000.0 50000.0 7862.0 50000.0 15415.0 7862.0 50000.0 15415.0 15415.0 50000.0 9885.0 4042.0 6194.0 9885.0 50000.0 50000.0 9885.0 50000.0 50000.0 50000.0 7862.0 6194.0 15415.0 15415.0 15415.0 9885.0 9885.0 7862.0 15415.0 9885.0 9885.0 50000.0 9885.0 50000.0 7862.0 50000.0 15415.0 50000.0 15415.0 6194.0 50000.0 15415.0 15415.0 9885.0 9885.0 50000.0 50000.0 15415.0 50000.0 15415.0 6194.0 15415.0 50000.0 15415.0 15415.0 7862.0 9885.0 9885.0 15415.0 9885.0 7862.0 4042.0 4042.0 15415.0 50000.0 
